RDATE( 8) Eighth Edition RDATE (8)

NAME

rdate - set time and date from a remote host

SYNOPSISS

rdate host ...

DESCRIPPTION Rdate obtains the current time from a remote time server. If run bythe super-user then local time is set to that time. The time of the remote host is printed on standard output.

More than one host name may be specified. They are tried one by one until one responds.

SEE AALSO

date(1), readclock (8), inet(8).

AUTHOR

Kees J. Bot (kjb@cs.vu.nl)

Page 1 November 23, 2003