DF (1) Eighth Edition DF (1)

NAME

df - report on free disk space

SYNOPSISS

df [- ikP] [- t type] [file ...]

DESCRIPPTION Df lists the amountof free space onthe currently mounted devices (no arguments), or the devices given as arguments. If the argument is not a device then the device it resides on is listed.

OPTIONS

Without options, df will givea listing like this:

Filesystem 1k-Blocks free used % FUsed% Mounted on
/dev/c0d0p1s0 1440 635 805 56% 26% /
/dev/c0d0p1s1 32768 32390 378 2% 1% /tmp
/dev/c0d0p1s2 784657 517809 266848 35% 29% /usr

The - i option shifts thefocus to the files:

Filesystem Files free used % BUsed% Mounted on
/dev/c0d0p1s0 1024 759 265 26% 56% /
/dev/c0d0p1s1 5472 5468 4 1% 2% /tmp
/dev/c0d0p1s2 65535 46734 18801 29% 35% /usr

Option - P makes df use POSIX defined output in 512 byte units:

Filesystem 512-blocks Used Available Capacity Mounted on
/dev/c0d0p1s0 2880 1628 1252 57% /
/dev/c0d0p1s1 65536 756 64780 2% /tmp
/dev/c0d0p1s2 1569314 533748 1035566 35% /usr

With -k 1024 byte units wouldbe used.

The - t option limits df’s output to file systems of the given type.

FILLES

/etc/mtab List of mounted file systems.

SEE AALSO

du(1), fstab(5).

BUGS

Default output should also be in 512 byte units says POSIX.

AUTHOR

Kees J. Bot (kjb@cs.vu.nl)

Page 1 May 7, 2001