DIR(5) Eighth Edition DIR (5)

NAME

dir - directory layout

SYNOPSISS

#include <sys/types.h> #include <sys/dir.h>

DESCRIPPTION The directories of the V1 and V2 file systems are arrays of the following structure defined in <sys/dir.h>:

struct direct {

ino_t d_ino; /* I-node number */ char d_name[14]; /* Name of up to 14 characters */ }; The d_ino field is the inode number of the file named by d_name . D_ino is zero if the directory slot isn’t allocated. This number is the same as st_ino returned by stat(2) unless the entry is mounted on. D_name is the name of up to 14 characters, null-terminated only ifless then 14 in length. Any character other than null or ’/’ is allowed.

See directory(3) for a portable way to access directories, Minix is probably the last system with these old V7 format directories.

SEE AALSO

directory(3).

AUTHOR

Kees J. Bot (kjb@cs.vu.nl)

Page 1 May 7, 2001