TTYNAME(3) Eighth Edition TTYNAME (3)

NAME

ttyname - file descriptor to terminal device name

SYNOPSISS

#define _POSIX_SOURCE 1 #include <unistd.h>

char *ttyname(int fd)

DESCRIPPTION Ttyname searches through the /dev directory for the terminal device file that is associated with file descriptor fd. It returns the full path name ofthe terminal file iffound, NULL is returned otherwise.

SEE AALSO

ttyslot(3).

AUTHOR

Kees J. Bot (kjb@cs.vu.nl)

Page 1 May 7, 2001