ABORT(3) Eighth Edition ABORT(3)

NAME

abort - generate a fault

SYNOPSISS

#include <stdlib.h>

void abort(void)

DESCRIPPTION Abort executes an instruction which is illegal in user mode. This causes a signal that normally terminates the process with a core dump, which may be used for debugging.

SEE ALSO

sigaction(2), exit(2).

DIAGNOSTICCS Usually ‘‘abort - core dumped’’ from the shell.

BUGS

The abort() function does not flush standard I/O buffers. Use fflush(3).

Page 1 (May 27, 1986) May 7, 2001