CHDIR(2) Eighth Edition CHDIR (2)

NAME

chdir - change current working directory SYNOPSISS

#include <unistd.h>

int chdir(const char *path) DESCRIPPTION Path is the pathname of a directory. Chdir causes this directory to become the current working directory, the starting point for path names not beginning with ‘‘/’’.

In order for a directory to become the current directory, a process must have execute (search) access to the directory.

RETURN VALUE Upon successful completion, a value of 0 is returned. Otherwise, a value of - 1 is returned and errnois set to indicate the error.

ERRORS

Chdir will fail and the current working directory will be unchanged ifone ormore of the following are true:

[ENOTDIR] A component of the path prefix is not a directory. [ENAMETOOLONG] The path name exceeds PATH_MAX characters.

[ENOENT] The named directory does not exist.

[ELOOP] Too many symbolic links were encountered in translating the pathname. (Minixvmd) [EACCES] Search permission is denied for any component of the path name. [EFAULT] Path points outside the process’s allocated address space. [EIO] An I/O error occurred while reading from or writing to the file system.

SEE AALSO

chroot (2).

Page 1 (August 26, 1985) May 7, 2001