KILL (1) Eighth Edition KILL (1)

NAME

kill - send a signal to a process SYNOPSISS

kill [- n] process OPTIONS

- n Signal number to send - NAME

Named signal to send EXAMPLES kill35 # Sendsignal 15to process 35 kill- 9 40 # Sendsignal 9to process 40 kill- 2 0 # Sendsignal 2to whole terminal process group kill- HUP -123 # Senda hangup to process group 123 DESCRIPPTION A signal is sent to a given process. By default signal 15 (SIGTERM) is sent. Process 0 means all the processes in the sender’s process group. A process group can be signalled by the negative value of the process group ID. Signals may be numerical, or the name of the signal without SIG.

SEE AALSO

kill(2), sigaction(2).

Page 1 May 7, 2001