FOLD(1) Eighth Edition FOLD(1)

NAME

fold - fold long lines

SYNOPSISS

fold [- n] [file] ...

OPTIONS

- n How long should theoutput lines be

EXAMPLES fold - 60 # Foldstdin to 60characters

fold file # Foldfile to 80characters

DESCRIPPTION Fold takes copies its input from the named file (or stdin, if none is specified) to standard output. However, lines longer than the given maximum (default 80) are broken into multiple lines of the maximum length by inserting new line characters.

SEE AALSO

width (1).

Page 1 May 7, 2001